Passed The Breath Test, But Still Arrested

I Actually Passed The Breath Test, But The Police Still Arrested Me. How Is That Possible? It is possible that the police arrested you even after you passed a breath test. This could be due to other evidence that the police obtained, such as witness statements or video footage of the incident. Additionally, if the … Continue reading "Passed The Breath Test, But Still Arrested"

The post Passed The Breath Test, But Still Arrested first appeared on Tampa Criminal Defense Lawyers.