How Does The Judge Or Jury Decide Who To Believe?

The judge or jury in a criminal trial must determine the credibility of the witnesses and decide which testimony to believe. In doing so, they consider a number of factors, such as the witness’s demeanor on the stand, their ability to recall events accurately, and any potential bias they may have. Additionally, they will look … Continue reading "How Does The Judge Or Jury Decide Who To Believe?"

The post How Does The Judge Or Jury Decide Who To Believe? first appeared on Tampa Criminal Defense Lawyers.